<template>
  <div>
    <!-- banner区域 start -->
    <div class="swiper-container banner" id="banner">
      <div class="swiper-wrapper">
        <div class="swiper-slide">
          <img src="/img/intradermik-banner.jpg" alt="" />
        </div>
      </div>
      <!-- <div class="swiper-pagination"></div> -->
    </div>
    <!-- banner区域 end -->

    <div class="main">
      <div class="container about">
        <div class="section-title">
          <img src="/img/intradermik-title-about.png" alt="品牌设备" />
          <h3>品牌设备</h3>
        </div>
        <div class="content clearfix">
          <div class="cover fl">
            <img src="/img/intradermik-about-cover.png" alt="" />
          </div>
          <div class="info fr">
            <div class="name">Intradermik</div>
            <div class="subname">便携式康复理疗设备</div>
            <div class="line"></div>
            <div class="description">
              <p>
                是集电容电阻靶向透热疗法、肌肉重塑疗法、免疫力助推发烧疗法、私密健康疗法于一体的便携式设备，可高效、便携地应用于康复治疗、运动损伤修复、亚健康疼痛管理、盆底私密健康等领域。
              </p>
              <p>其频率(448kHz)和电脉冲的组合双效刺激细胞运动，并对修复受损组织有着显著的效果。</p>
            </div>
          </div>
        </div>
      </div>

      <div class="container about-device">
        <div class="section-title">
          <img src="/img/intradermik-title-introduction.png" alt="设备亮点" />
          <h3>设备亮点</h3>
        </div>
        <div class="content">
          <img src="/img/intradermik-about-device-cover.png" alt="设备介绍" />
        </div>
      </div>

      <div class="container therapy">
        <div class="section-title">
          <img src="/img/intradermik-title-therapie.png" alt="四大疗法" />
          <h3>四大疗法</h3>
        </div>
        <div class="content">
          <div class="section therapy-1">
            <div class="cover">
              <img src="/img/intradermik-therapy-01.png" alt="" />
            </div>
            <div class="info">
              <div class="title">透热疗法</div>
              <div class="subtitle">Diathermy in capacitive and resistive application</div>
              <div class="desc">TECARpro 是一种物理康复治疗方式，可刺激不同受损组织（如肌肉、肌腱、脂肪、皮肤等）， 以促进组织恢复。</div>
              <div class="row">
                <div class="label">电阻式（深层）：</div>
                <div class="text">作用于脂肪、骨骼、肌腱、脏腑，促进全身血液循环，深层淋巴引流，活化脏腑器官</div>
              </div>
              <div class="row">
                <div class="label">电容式（浅层）：</div>
                <div class="text">作用于皮下3-5cm，改善橘皮组织，缓解肌肉疲劳，促进微循环</div>
              </div>
            </div>
          </div>
          <div class="section therapy-2">
            <div class="cover">
              <img src="/img/intradermik-therapy-02.png" alt="" />
            </div>
            <div class="info">
              <div class="title">肌肉重塑疗法</div>
              <div class="subtitle">Electrical impulse muscle tone</div>
              <div class="desc">由四种原始波段：（肌肉电刺激，科兹电流，干扰电流，精皮神经点刺激）组成三十种针对不同肌肉状态和不同程度的疼痛调理方案</div>
              <div class="row">
                <div class="label">四大治疗方向：</div>
                <div class="item">1.预防肌肉僵硬或萎缩</div>
                <div class="item">2.针对已有的肌肉废用或僵直进行调理</div>
                <div class="item">3.缓解长时间的劳损积累导致的顽固性疼痛和麻木等</div>
                <div class="item">4.应对急性剧疼采用阻滞神经感知及时进行物理介入</div>
              </div>
            </div>
          </div>
          <div class="section therapy-3">
            <div class="cover">
              <img src="/img/intradermik-therapy-03.png" alt="" />
            </div>
            <div class="info">
              <div class="title">免疫力助推发烧疗法</div>
              <div class="subtitle">Immune boosting with bracelets fever therapy</div>
              <div class="desc">
                采用448kHz频率，通过特定的免疫力助推手环作用于人体四肢，渗透诱发全身细胞跨膜运动，使人体通过内生热的方式提升基础体温至42℃，持续12小时，激活免疫系统。
              </div>
              <div class="row">
                <div class="label">发烧疗法理疗应用</div>
                <div class="item">
                  通过搭桥手法的方式可灵活地作用于精细关节部位，精准地控制能量传输，针对不同位置不同程度的运动损伤、疼痛，进行全方位调理亚健康问题。
                </div>
              </div>
            </div>
          </div>
          <div class="section therapy-4">
            <div class="cover">
              <img src="/img/intradermik-therapy-04.png" alt="" />
            </div>
            <div class="info">
              <div class="title">私密健康疗法</div>
              <div class="subtitle">Pelvic floor treatment</div>
              <div class="row">
                <div class="label">独特频率448kHz</div>
                <div class="item">作用于阴道粘膜层、真皮纤维层、肌肉层</div>
                <div class="item">细胞再生</div>
                <div class="item">保护黏膜系统的同时收紧阴道</div>
                <div class="item">增加敏感度</div>
                <div class="item">非热作用还可以平衡内部菌群，起到消炎的作用</div>
              </div>
              <div class="row">
                <div class="label">神经肌肉电刺激（NMES）</div>
                <div class="item">同时刺激运动神经纤维和传入感觉神经纤维</div>
                <div class="item">利用神经细胞的电兴奋性</div>
                <div class="item">通过脉冲电流刺激支配肌肉神经促使肌肉进行等张和等长训练</div>
              </div>
            </div>
          </div>
        </div>
      </div>
      <div class="container device">
        <div class="section-title">
          <img src="/img/intradermik-title-accessories.png" alt="设备配件" />
          <h3>设备配件</h3>
        </div>
        <div class="content">
          <div class="scroll-box only-mobile">
            <img src="/img/intradermik-device-01.png" alt="" />
            <img src="/img/intradermik-device-02.png" alt="" />
            <img src="/img/intradermik-device-03.png" alt="" />
            <img src="/img/intradermik-device-04.png" alt="" />
            <img src="/img/intradermik-device-05.png" alt="" />
          </div>
          <div class="swiper-container only-pc" id="deviceSwiper">
            <div class="swiper-wrapper">
              <div class="swiper-slide">
                <img src="/img/intradermik-device-01.png" alt="" />
              </div>
              <div class="swiper-slide">
                <img src="/img/intradermik-device-02.png" alt="" />
              </div>
              <div class="swiper-slide">
                <img src="/img/intradermik-device-03.png" alt="" />
              </div>
              <div class="swiper-slide">
                <img src="/img/intradermik-device-04.png" alt="" />
              </div>
              <div class="swiper-slide">
                <img src="/img/intradermik-device-05.png" alt="" />
              </div>
              <div class="swiper-slide">
                <img src="/img/intradermik-device-06.png" alt="" />
              </div>
            </div>
          </div>
          <!-- 如果需要导航按钮 -->
          <div class="swiper-prev"></div>
          <div class="swiper-next"></div>
        </div>
      </div>
    </div>
  </div>
</template>

<script>
export default {
  head() {
    return {
      title: '首页-艾斯佰丽官网-产品系列-INTRADERMIK',
    }
  },
  mounted() {
    var bannerSwiper = new Swiper('#banner', {
      loop: false, // 循环模式选项
      // 如果需要分页器
      pagination: {
        el: '.swiper-pagination',
      },
    })

    var deviceSwiper = new Swiper('#deviceSwiper', {
      loop: true, // 循环模式选项
      autoplay: true,
      slidesPerView: 6,
      spaceBetween: 10,
      // 如果需要前进后退按钮
      navigation: {
        nextEl: '.device .swiper-next',
        prevEl: '.device .swiper-prev',
      },
    })
  },
}
</script>

<style lang="scss" scoped>
@media screen and (min-width: 768px) {
  .main {
    .about {
      .cover {
        img {
          display: block;
          width: 470px;
          height: 480px;
        }
      }

      .info {
        width: 660px;
        padding-top: 65px;

        .name {
          font-size: 50px;
          color: #5ba9ad;
          font-weight: bold;
        }
        .subname {
          font-size: 30px;
          margin-top: 15px;
        }
        .line {
          width: 36px;
          height: 7px;
          background: #5ba9ad;
          margin: 20px 0 30px;
        }
        .description {
          text-align: justify;
          word-break: break-all;
          font-weight: lighter;
          line-height: 36px;
          p {
            margin-top: 24px;
            font-size: 20px;
          }
        }
      }
    }

    .about-device {
      .content {
        img {
          display: block;
          width: 100%;
        }
      }
    }

    .therapy {
      .content {
        .section {
          background: #eeeeee;
          padding: 24px 24px 24px 56px;
          display: -webkit-box;
          display: -ms-flexbox;
          display: flex;
          -webkit-box-pack: justify;
          -ms-flex-pack: justify;
          justify-content: space-between;
          -webkit-box-orient: horizontal;
          -webkit-box-direction: reverse;
          -ms-flex-direction: row-reverse;
          flex-direction: row-reverse;
          margin-top: 20px;

          &:first-child {
            margin-top: 0;
          }

          .info {
            margin-right: 24px;
            -webkit-box-flex: 1;
            -ms-flex: 1;
            flex: 1;
            -ms-flex-negative: 0;
            flex-shrink: 0;
            text-align: justify;
            word-break: break-all;

            .cover {
              img {
                display: block;
                width: 560px;
              }
            }

            .title {
              font-size: 36px;
              color: #5ba9ad;
              font-weight: bold;
              margin-top: 20px;
            }

            .subtitle {
              font-size: 16px;
              color: #434343;
              font-weight: lighter;
              text-transform: uppercase;
              margin-top: 4px;
            }

            .desc {
              font-size: 27px;
              color: #434343;
              line-height: 38px;
              margin-top: 50px;
            }

            .row {
              margin-top: 68px;
              .label {
                font-size: 29px;
                color: #434343;
                font-weight: bold;
              }
              .text {
                font-size: 25px;
                line-height: 38px;
                color: #434343;
                margin-top: 10px;
              }
              .item {
                font-size: 22px;
                color: #434343;
                font-weight: lighter;
                margin-top: 20px;
                line-height: 1.5;
              }
            }
          }

          &.therapy-2 {
            .row {
              margin-top: 90px;
            }
          }
          &.therapy-3 {
            .row {
              margin-top: 80px;
              .item {
                line-height: 38px;
              }
            }
            .desc {
              line-height: 42px;
            }
          }
          &.therapy-4 {
            .row {
              margin-top: 50px;
              .label {
                margin-bottom: 16px;
              }
              .item {
                margin-top: 12px;
              }
            }
          }
        }
      }
    }

    .device {
      .content {
        position: relative;

        .swiper-container {
          width: 1100px;
          margin: 0 auto;

          img {
            display: block;
            width: 100%;
          }
        }

        .swiper-prev,
        .swiper-next {
          position: absolute;
          left: 0;
          top: 50%;
          -webkit-transform: translateY(-50%);
          transform: translateY(-50%);
          width: 48px;
          height: 72px;
          background-color: rgba(55, 55, 55, 0.6) !important;
          z-index: 5;
          cursor: pointer;
          background: url(/img/icon-arrow-left.png) no-repeat center;
        }

        .swiper-next {
          left: unset;
          right: 0;
          background: url(/img/icon-arrow-right.png) no-repeat center;
        }
      }
    }
  }
}

@media screen and (max-width: 768px) {
  .main {
    .about {
      .content {
        display: -webkit-box;
        display: -ms-flexbox;
        display: flex;
        -webkit-box-orient: vertical;
        -webkit-box-direction: reverse;
        -ms-flex-direction: column-reverse;
        flex-direction: column-reverse;
        -webkit-box-align: center;
        -ms-flex-align: center;
        align-items: center;
        .cover {
          margin-top: 0.4rem;
          img {
            display: block;
            width: 5.46rem;
            height: 5.57rem;
          }
        }

        .info {
          width: 6.5rem;
          margin: 0 auto;
          .name {
            font-size: 0.34rem;
            color: #5ba9ad;
            text-align: center;
            font-weight: bold;
          }
          .subname {
            font-size: 0.26rem;
            margin-top: 0.16rem;
            text-align: center;
          }
          .line {
            width: 0.4rem;
            height: 0.06rem;
            background: #5ba9ad;
            margin: 0.32rem auto;
          }
          .description {
            text-align: justify;
            word-break: break-all;
            color: #333333;
            text-align: center;
            p {
              font-size: 0.26rem;
              line-height: 0.48rem;
            }
          }
        }
      }
    }

    .about-device {
      width: 6.86rem;
      margin: 0 auto;
      .content {
        img {
          display: block;
          width: 100%;
        }
      }
    }

    .therapy {
      .content {
        .section {
          width: 6.86rem;
          margin: 0 auto;
          background: #eeeeee;
          padding: 0.4rem;
          margin-top: 0.32rem;
          -webkit-box-sizing: border-box;
          box-sizing: border-box;

          &:first-child {
            margin-top: 0;
          }

          .cover {
            img {
              display: block;
              width: 100%;
            }
          }

          .info {
            text-align: center;
            word-break: break-all;

            .title {
              font-size: 0.3rem;
              color: #5ba9ad;
              font-weight: bold;
              margin-top: 0.4rem;
            }

            .subtitle {
              font-size: 0.24rem;
              color: #333;
              margin-top: 0.16rem;
            }

            .desc {
              font-size: 0.26rem;
              color: #333;
              line-height: 0.48rem;
              margin-top: 0.32rem;
            }

            .row {
              margin-top: 0.4rem;
              .label {
                font-size: 0.26rem;
                color: #434343;
                font-weight: bold;
              }
              .text {
                font-size: 0.26rem;
                line-height: 0.48rem;
                color: #434343;
              }
              .item {
                font-size: 0.26rem;
                color: #333;
                margin-top: 0.16rem;
                line-height: 1.5;
              }
            }
          }

          &.therapy-2 {
            .row {
              margin-top: 0.32rem;
            }
          }
          &.therapy-3 {
            .row {
              margin-top: 0.4rem;
            }
          }
          &.therapy-4 {
            .row {
              margin-top: 0.48rem;
            }
          }
        }
      }
    }

    .device {
      .scroll-box {
        img {
          width: 1.77rem;
          height: 2.27rem;
          margin-right: 0.24rem;

          &:first-child {
            margin-left: 0.32rem;
          }

          &:last-child {
            margin-right: 0.32rem;
          }
        }
      }
    }
  }
}
</style>
